import { describe, expect, it } from "vitest";

// Minimal smoke test — verify the test file itself is valid and can run.
// Full plugin component tests will be added in subsequent tasks per PRI-189.
describe("ArgoCD Plugin Scaffold", () => {
  it("test suite loads without errors", () => {
    // Intentionally simple: just verify vitest is working and this file parses
    expect(true).toBe(true);
  });
});
